-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314373269595
cusum  =  0.14818659497
eta  =  0.510801155228
hl_amp_ratio  =  0.400062547497
kurtosis  =  0.187145185828
n_points  =  444
period  =  0.608866028222
period_SNR  =  44.2297909407
period_log10FAP  =  -43.5354847389
period_uncertainty  =  0.000101803445118
phase_cusum  =  0.234521797895
phase_eta  =  0.585281445346
phi21  =  -2.12535719286
phi31  =  -0.731313845356
quartile31  =  0.3925
r21  =  0.455865073428
r31  =  0.28573288202
shapiro_w  =  0.924422979355
skewness  =  -0.899286649368
slope_per10  =  -0.0599193462496
slope_per90  =  0.0891441809665
stetson_k  =  0.73668295272
weighted_mean  =  12.8273483403
weighted_std  =  0.291778526446
