-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.335785039818
cusum  =  0.113548912809
eta  =  0.487327096066
hl_amp_ratio  =  0.576540186515
kurtosis  =  -0.429304420997
n_points  =  346
period  =  0.63385170773
period_SNR  =  31.678711223
period_log10FAP  =  -35.8805402171
period_uncertainty  =  0.000111877246309
phase_cusum  =  0.20836538155
phase_eta  =  0.18645059515
phi21  =  -2.11006843571
phi31  =  -4.14556114036
quartile31  =  0.3775
r21  =  0.577905581635
r31  =  0.363427637327
shapiro_w  =  0.944296061993
skewness  =  -0.634173489633
slope_per10  =  -0.174391749219
slope_per90  =  0.28849998489
stetson_k  =  0.786254213561
weighted_mean  =  13.2513275194
weighted_std  =  0.280723182395
