-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.433881309224
cusum  =  0.223409792815
eta  =  0.771085428118
hl_amp_ratio  =  0.648538195231
kurtosis  =  -1.39499074428
n_points  =  110
period  =  0.543546225831
period_SNR  =  19.3462792243
period_log10FAP  =  -9.92302467217
period_uncertainty  =  0.000122601784187
phase_cusum  =  0.250413537879
phase_eta  =  0.445538963258
phi21  =  0.611179863889
phi31  =  -1.20053919006
quartile31  =  0.7975
r21  =  0.340255123092
r31  =  0.308844847961
shapiro_w  =  0.903281152248
skewness  =  -0.28134667278
slope_per10  =  -0.0777249708858
slope_per90  =  0.343512502174
stetson_k  =  0.85097333342
weighted_mean  =  15.434422765
weighted_std  =  0.423718323133
