-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.285999195096
cusum  =  0.13081340506
eta  =  0.674094948074
hl_amp_ratio  =  0.572225040852
kurtosis  =  -0.883193504131
n_points  =  334
period  =  0.512940065422
period_SNR  =  40.8542518161
period_log10FAP  =  -40.4462765011
period_uncertainty  =  0.000114738863546
phase_cusum  =  0.221040532169
phase_eta  =  0.439123714075
phi21  =  0.932804165672
phi31  =  -1.38352930717
quartile31  =  0.4175
r21  =  0.367932464482
r31  =  0.24131942296
shapiro_w  =  0.950871825218
skewness  =  -0.443689966332
slope_per10  =  -0.0753767315487
slope_per90  =  0.063274815329
stetson_k  =  0.800617424552
weighted_mean  =  17.2387778658
weighted_std  =  0.262655787376
