-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.326999413121
cusum  =  0.212850908148
eta  =  0.998125030632
hl_amp_ratio  =  0.601624497511
kurtosis  =  -0.717937296144
n_points  =  69
period  =  0.594149918882
period_SNR  =  12.828071726
period_log10FAP  =  -4.66017478439
period_uncertainty  =  0.000178503822296
phase_cusum  =  0.313213165566
phase_eta  =  0.261463146089
phi21  =  -2.6105410176
phi31  =  -4.46523430443
quartile31  =  0.37
r21  =  0.440027500894
r31  =  0.270869240669
shapiro_w  =  0.949930667877
skewness  =  -0.488282615956
slope_per10  =  -0.246438918929
slope_per90  =  0.359979174938
stetson_k  =  0.776615150204
weighted_mean  =  15.2385629874
weighted_std  =  0.275258171392
