-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.220949612828
cusum  =  0.212619252957
eta  =  0.589093802587
hl_amp_ratio  =  0.475489216922
kurtosis  =  -1.00624390567
n_points  =  247
period  =  0.571887471152
period_SNR  =  36.485238107
period_log10FAP  =  -31.7022805593
period_uncertainty  =  0.000149171829234
phase_cusum  =  0.264732580099
phase_eta  =  0.293549045322
phi21  =  -2.20119722926
phi31  =  -3.8254627604
quartile31  =  0.3
r21  =  0.405645379035
r31  =  0.187122935913
shapiro_w  =  0.934348583221
skewness  =  -0.451265179584
slope_per10  =  -0.177649642593
slope_per90  =  0.234496309818
stetson_k  =  0.787048098205
weighted_mean  =  14.6233998019
weighted_std  =  0.190411651384
