-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.431405895488
cusum  =  0.118237178892
eta  =  0.488763731283
hl_amp_ratio  =  0.234668618051
kurtosis  =  -0.61331740735
n_points  =  268
period  =  0.636930056851
period_SNR  =  37.6406757403
period_log10FAP  =  -30.4826721896
period_uncertainty  =  0.000185720981955
phase_cusum  =  0.218339257924
phase_eta  =  0.47956307407
phi21  =  0.683292674726
phi31  =  1.76723623469
quartile31  =  0.5525
r21  =  0.45658498004
r31  =  0.280646967902
shapiro_w  =  0.878841280937
skewness  =  -0.807885934502
slope_per10  =  -0.115834966119
slope_per90  =  0.227572688936
stetson_k  =  0.699575607927
weighted_mean  =  12.7871151787
weighted_std  =  0.379018818271
