-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.204005732759
cusum  =  0.147864357655
eta  =  0.673060286941
hl_amp_ratio  =  0.485316032293
kurtosis  =  -0.874513260801
n_points  =  104
period  =  0.829593839374
period_SNR  =  11.727238737
period_log10FAP  =  -9.06509847812
period_uncertainty  =  0.000149220949045
phase_cusum  =  0.301993901962
phase_eta  =  0.466310362831
phi21  =  -0.764493692489
phi31  =  -1.24741066401
quartile31  =  0.3025
r21  =  0.354315380833
r31  =  0.176573568308
shapiro_w  =  0.921238005161
skewness  =  -0.551539016782
slope_per10  =  -0.261333333328
slope_per90  =  0.337100001052
stetson_k  =  0.813563913164
weighted_mean  =  12.8911290323
weighted_std  =  0.208426554239
