-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.262032997318
cusum  =  0.1154899817
eta  =  0.603767492331
hl_amp_ratio  =  0.257188619237
kurtosis  =  -0.873675810186
n_points  =  195
period  =  0.587126798107
period_SNR  =  24.1170830721
period_log10FAP  =  -21.8698618474
period_uncertainty  =  0.000135078149093
phase_cusum  =  0.285704920255
phase_eta  =  0.280495148544
phi21  =  0.871059602316
phi31  =  1.97751205125
quartile31  =  0.385
r21  =  0.48422864053
r31  =  0.35612501249
shapiro_w  =  0.875819206238
skewness  =  -0.70271940414
slope_per10  =  -0.32745001372
slope_per90  =  0.322536577982
stetson_k  =  0.712417227321
weighted_mean  =  15.3117742415
weighted_std  =  0.253452934175
