-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.31390977755
cusum  =  0.199275711838
eta  =  0.773486498682
hl_amp_ratio  =  0.311434738914
kurtosis  =  1.27249591668
n_points  =  276
period  =  0.58976146709
period_SNR  =  32.3330370343
period_log10FAP  =  -22.6123324175
period_uncertainty  =  0.000159459645645
phase_cusum  =  0.270556070823
phase_eta  =  0.567733094337
phi21  =  3.99250866052
phi31  =  4.51653531553
quartile31  =  0.3325
r21  =  0.46832891195
r31  =  0.294910363728
shapiro_w  =  0.903295874596
skewness  =  -0.867497792456
slope_per10  =  -0.0793847619019
slope_per90  =  0.098752582662
stetson_k  =  0.620849398972
weighted_mean  =  16.8098031148
weighted_std  =  0.295114862164
