-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.352231947084
cusum  =  0.264676123226
eta  =  0.357919151752
hl_amp_ratio  =  0.602523194853
kurtosis  =  0.215708010773
n_points  =  250
period  =  0.538912314129
period_SNR  =  19.4848994891
period_log10FAP  =  -15.8308418243
period_uncertainty  =  0.00010408401442
phase_cusum  =  0.22979576709
phase_eta  =  0.682225429797
phi21  =  0.628804923246
phi31  =  1.47475117972
quartile31  =  0.3575
r21  =  0.542155652277
r31  =  0.326835948005
shapiro_w  =  0.944170057774
skewness  =  -0.766287512604
slope_per10  =  -0.0824296567166
slope_per90  =  0.121823477381
stetson_k  =  0.741732484909
weighted_mean  =  12.2282697548
weighted_std  =  0.332982563692
