-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.311495718889
cusum  =  0.135991368823
eta  =  0.564202349448
hl_amp_ratio  =  0.460748918025
kurtosis  =  -0.100583919435
n_points  =  187
period  =  0.681151537736
period_SNR  =  23.2501551989
period_log10FAP  =  -21.6443617276
period_uncertainty  =  0.000133863604079
phase_cusum  =  0.251845338132
phase_eta  =  0.118681212403
phi21  =  -2.08450799871
phi31  =  -0.589602469596
quartile31  =  0.325
r21  =  0.473319834055
r31  =  0.227400586363
shapiro_w  =  0.944037079811
skewness  =  -0.716958417916
slope_per10  =  -0.108190407955
slope_per90  =  0.662800017744
stetson_k  =  0.761569832683
weighted_mean  =  13.3907277628
weighted_std  =  0.223238257066
