-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.355842419653
cusum  =  0.12603745982
eta  =  0.455867677263
hl_amp_ratio  =  0.269346082607
kurtosis  =  -0.271000822669
n_points  =  382
period  =  0.600458462516
period_SNR  =  47.1318486127
period_log10FAP  =  -49.9153673365
period_uncertainty  =  0.000100384258163
phase_cusum  =  0.273164396876
phase_eta  =  0.0318384034851
phi21  =  -2.43199338819
phi31  =  -1.42229353364
quartile31  =  0.36
r21  =  0.512649772638
r31  =  0.368472201089
shapiro_w  =  0.852146327496
skewness  =  -0.992910678843
slope_per10  =  -0.150745684119
slope_per90  =  0.25496785197
stetson_k  =  0.705735892766
weighted_mean  =  15.3526711772
weighted_std  =  0.309915624708
