-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.288925446263
cusum  =  0.107242074838
eta  =  0.790063562465
hl_amp_ratio  =  0.324203909511
kurtosis  =  -0.512658660661
n_points  =  166
period  =  0.52690658753
period_SNR  =  23.7811720364
period_log10FAP  =  -16.5963973061
period_uncertainty  =  0.000164576036008
phase_cusum  =  0.298003196293
phase_eta  =  0.518127692127
phi21  =  0.946232092843
phi31  =  -0.888980640777
quartile31  =  0.4175
r21  =  0.328742727226
r31  =  0.153020987763
shapiro_w  =  0.88201713562
skewness  =  -0.838169881866
slope_per10  =  -0.136216348923
slope_per90  =  0.2111800001
stetson_k  =  0.711978163043
weighted_mean  =  15.2530680486
weighted_std  =  0.281331563351
