-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.266811042341
cusum  =  0.0820425312442
eta  =  0.802935766622
hl_amp_ratio  =  0.70887127922
kurtosis  =  -0.337006632423
n_points  =  313
period  =  0.618979363425
period_SNR  =  47.7335498225
period_log10FAP  =  -37.2388223
period_uncertainty  =  0.000108959896817
phase_cusum  =  0.256064920102
phase_eta  =  0.300567570973
phi21  =  -1.9351683283
phi31  =  -0.652427883567
quartile31  =  0.32
r21  =  0.475916148468
r31  =  0.224610483887
shapiro_w  =  0.97449362278
skewness  =  -0.480243708551
slope_per10  =  -0.126689170359
slope_per90  =  0.147266671332
stetson_k  =  0.791699817153
weighted_mean  =  15.7857068948
weighted_std  =  0.215983620296
