-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.332132972049
cusum  =  0.177905231878
eta  =  0.419604131652
hl_amp_ratio  =  0.569311179686
kurtosis  =  -0.533675785121
n_points  =  385
period  =  0.677008778177
period_SNR  =  44.2685794242
period_log10FAP  =  -48.5960998115
period_uncertainty  =  0.000129318612831
phase_cusum  =  0.203007101019
phase_eta  =  0.327430437602
phi21  =  -2.07787966906
phi31  =  -4.03723964666
quartile31  =  0.42
r21  =  0.492517450235
r31  =  0.244079553255
shapiro_w  =  0.939097642899
skewness  =  -0.640461629369
slope_per10  =  -0.0797625616127
slope_per90  =  0.225533327709
stetson_k  =  0.805580937677
weighted_mean  =  13.5436499871
weighted_std  =  0.286826398306
