-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.406485439259
cusum  =  0.192772600109
eta  =  0.75260005439
hl_amp_ratio  =  0.569653754003
kurtosis  =  -0.709323260966
n_points  =  99
period  =  0.603482111676
period_SNR  =  17.6459693056
period_log10FAP  =  -11.4419055925
period_uncertainty  =  0.000132261361335
phase_cusum  =  0.260826186332
phase_eta  =  0.24784870659
phi21  =  0.812872173035
phi31  =  -1.18707515961
quartile31  =  0.47
r21  =  0.367277957914
r31  =  0.144286793809
shapiro_w  =  0.931487798691
skewness  =  -0.520398409543
slope_per10  =  -0.19139081756
slope_per90  =  0.602838189148
stetson_k  =  0.810587093526
weighted_mean  =  14.6291570248
weighted_std  =  0.304371646692
