-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.319663299981
cusum  =  0.0726509274883
eta  =  0.620749509999
hl_amp_ratio  =  0.470984578265
kurtosis  =  -0.752773378076
n_points  =  420
period  =  0.653023457841
period_SNR  =  55.7648651218
period_log10FAP  =  -56.935869107
period_uncertainty  =  0.000119812028281
phase_cusum  =  0.21200544284
phase_eta  =  0.161052341871
phi21  =  -2.22105685762
phi31  =  -0.932175497291
quartile31  =  0.48
r21  =  0.470150697045
r31  =  0.2964353822
shapiro_w  =  0.926711201668
skewness  =  -0.592936163429
slope_per10  =  -0.105581520928
slope_per90  =  0.233165431684
stetson_k  =  0.792391654589
weighted_mean  =  14.1880070881
weighted_std  =  0.296697341972
