-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.269675165007
cusum  =  0.157916352928
eta  =  0.62729956332
hl_amp_ratio  =  0.391911075365
kurtosis  =  -0.758854576612
n_points  =  294
period  =  0.595025699251
period_SNR  =  48.0836256881
period_log10FAP  =  -42.4507204284
period_uncertainty  =  0.000100361913963
phase_cusum  =  0.271291191124
phase_eta  =  0.144647223657
phi21  =  4.01797944267
phi31  =  4.73234702117
quartile31  =  0.37
r21  =  0.356298343557
r31  =  0.268086149942
shapiro_w  =  0.914639174938
skewness  =  -0.63688248204
slope_per10  =  -0.11731001211
slope_per90  =  0.236318389579
stetson_k  =  0.7594839668
weighted_mean  =  15.9593161736
weighted_std  =  0.220751016066
