-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.355695594634
cusum  =  0.260369764682
eta  =  0.519942008063
hl_amp_ratio  =  0.419977527977
kurtosis  =  -0.0660332658423
n_points  =  113
period  =  0.570087778692
period_SNR  =  17.2483235458
period_log10FAP  =  -12.1631111168
period_uncertainty  =  0.00016419579991
phase_cusum  =  0.277779333653
phase_eta  =  0.350059351842
phi21  =  -2.43904635521
phi31  =  -1.39222216944
quartile31  =  0.37
r21  =  0.474968160261
r31  =  0.248361912798
shapiro_w  =  0.887147128582
skewness  =  -0.964119177397
slope_per10  =  -0.278591779347
slope_per90  =  0.485364953619
stetson_k  =  0.716939150369
weighted_mean  =  15.1951868514
weighted_std  =  0.293919056482
