-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.300595630849
cusum  =  0.200529061779
eta  =  0.443022932957
hl_amp_ratio  =  0.911957696133
kurtosis  =  -0.333267390129
n_points  =  177
period  =  4.32232957064
period_SNR  =  20.3193739438
period_log10FAP  =  -18.3178013745
period_uncertainty  =  0.00498654256563
phase_cusum  =  0.25736144076
phase_eta  =  0.292072454533
phi21  =  -0.644021487485
phi31  =  0.453049511053
quartile31  =  0.41
r21  =  0.187575394151
r31  =  0.0995620381356
shapiro_w  =  0.962007343769
skewness  =  -0.454019010469
slope_per10  =  -0.619063803262
slope_per90  =  0.690799998119
stetson_k  =  0.845235056326
weighted_mean  =  13.0424858757
weighted_std  =  0.258399093668
