-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.572099660014
cusum  =  0.229216575627
eta  =  1.59900103687
hl_amp_ratio  =  1.59471688508
kurtosis  =  -1.66836876163
n_points  =  19
period  =  0.668683197279
period_SNR  =  5.8513735168
period_log10FAP  =  -3.52943852759e-14
period_uncertainty  =  0.000131851172883
phase_cusum  =  0.283366754057
phase_eta  =  0.780862823793
phi21  =  -3.31787266264
phi31  =  -3.70441217832
quartile31  =  0.855
r21  =  0.281174810203
r31  =  0.149694079571
shapiro_w  =  0.844513654709
skewness  =  0.158794655112
slope_per10  =  -0.311874972325
slope_per90  =  0.406089107997
stetson_k  =  0.908746503847
weighted_mean  =  15.8217650046
weighted_std  =  0.402501428117
