-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.41730966572
cusum  =  0.190755763979
eta  =  0.724504828596
hl_amp_ratio  =  0.38453184182
kurtosis  =  -1.16965938741
n_points  =  147
period  =  0.529822595323
period_SNR  =  22.2685116071
period_log10FAP  =  -17.1819381483
period_uncertainty  =  0.000148795235415
phase_cusum  =  0.279703706347
phase_eta  =  0.109015469444
phi21  =  0.840178301726
phi31  =  -1.18772614974
quartile31  =  0.67
r21  =  0.519623454677
r31  =  0.315853220225
shapiro_w  =  0.899567842484
skewness  =  -0.454485441211
slope_per10  =  -0.140116956446
slope_per90  =  0.401800004765
stetson_k  =  0.797946898395
weighted_mean  =  13.952822159
weighted_std  =  0.387157273501
