-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.300577218088
cusum  =  0.131656631991
eta  =  0.574122068038
hl_amp_ratio  =  1.09802500994
kurtosis  =  -1.11911915477
n_points  =  273
period  =  0.754215833043
period_SNR  =  31.917455122
period_log10FAP  =  -31.933683854
period_uncertainty  =  0.000164145526973
phase_cusum  =  0.261111265037
phase_eta  =  0.462647294384
phi21  =  0.950534251191
phi31  =  2.69706553283
quartile31  =  0.5
r21  =  0.375047809452
r31  =  0.239870740683
shapiro_w  =  0.963504970074
skewness  =  0.0209172560909
slope_per10  =  -0.170125718229
slope_per90  =  0.171126004598
stetson_k  =  0.86763096025
weighted_mean  =  12.1641391941
weighted_std  =  0.283524538224
