-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.184373361144
cusum  =  0.11295984708
eta  =  0.622118732224
hl_amp_ratio  =  0.791587753851
kurtosis  =  -0.985801567327
n_points  =  363
period  =  0.67816991807
period_SNR  =  42.3142964811
period_log10FAP  =  -42.0943670116
period_uncertainty  =  0.000129808196525
phase_cusum  =  0.271655840774
phase_eta  =  0.435059384332
phi21  =  1.37200383483
phi31  =  2.43166916704
quartile31  =  0.275
r21  =  0.392414672517
r31  =  0.127152539516
shapiro_w  =  0.966948866844
skewness  =  -0.182669864651
slope_per10  =  -0.129199996591
slope_per90  =  0.148999985928
stetson_k  =  0.827733827396
weighted_mean  =  13.8093577335
weighted_std  =  0.170326421956
