-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.322731464709
cusum  =  0.316276644222
eta  =  0.370644194441
hl_amp_ratio  =  1.13276250115
kurtosis  =  -0.407223059443
n_points  =  295
period  =  1.00001640928
period_SNR  =  26.0613535012
period_log10FAP  =  -23.0935328307
period_uncertainty  =  0.00027224667332
phase_cusum  =  0.2655368045
phase_eta  =  0.641812408136
phi21  =  -1.30311095762
phi31  =  -3.6614674863
quartile31  =  0.355
r21  =  0.357906101063
r31  =  0.233303246547
shapiro_w  =  0.977721571922
skewness  =  0.176766209247
slope_per10  =  -0.078194101188
slope_per90  =  0.161170036802
stetson_k  =  0.772897713289
weighted_mean  =  11.9663705485
weighted_std  =  0.303104910064
