-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.263902314773
cusum  =  0.205146914425
eta  =  0.654452837678
hl_amp_ratio  =  1.08088003895
kurtosis  =  -1.04532304304
n_points  =  172
period  =  0.659213003509
period_SNR  =  23.7297459196
period_log10FAP  =  -19.7493868187
period_uncertainty  =  0.000128491545991
phase_cusum  =  0.27521835097
phase_eta  =  0.153715630751
phi21  =  1.1016100532
phi31  =  2.53367290775
quartile31  =  0.3525
r21  =  0.421446578175
r31  =  0.275513171279
shapiro_w  =  0.957417905331
skewness  =  -0.133771160985
slope_per10  =  -0.182095864809
slope_per90  =  0.317765179102
stetson_k  =  0.840185718665
weighted_mean  =  13.9555541454
weighted_std  =  0.22662604167
