-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.561847847513
cusum  =  0.168497456439
eta  =  0.441161972883
hl_amp_ratio  =  0.333306435312
kurtosis  =  -0.687676622605
n_points  =  250
period  =  0.468452515288
period_SNR  =  35.3966553646
period_log10FAP  =  -30.9237274869
period_uncertainty  =  0.000100504727635
phase_cusum  =  0.302037604725
phase_eta  =  0.0752680766697
phi21  =  -2.39864496345
phi31  =  -4.64263918296
quartile31  =  0.7875
r21  =  0.4738309678
r31  =  0.372228008596
shapiro_w  =  0.861268043518
skewness  =  -0.814183295026
slope_per10  =  -0.130576443874
slope_per90  =  0.293165648803
stetson_k  =  0.749346368482
weighted_mean  =  12.0469921434
weighted_std  =  0.50432783421
