-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.34812169773
cusum  =  0.135401269198
eta  =  0.783213942091
hl_amp_ratio  =  0.287537892982
kurtosis  =  -0.0739186522571
n_points  =  297
period  =  0.762242816938
period_SNR  =  47.9707096158
period_log10FAP  =  -41.8361113163
period_uncertainty  =  0.000200484710592
phase_cusum  =  0.231990634403
phase_eta  =  0.205706503198
phi21  =  0.654913947297
phi31  =  1.53368153145
quartile31  =  0.41
r21  =  0.3776863634
r31  =  0.208263716937
shapiro_w  =  0.898213207722
skewness  =  -0.658307368539
slope_per10  =  -0.209493909708
slope_per90  =  0.307545345251
stetson_k  =  0.71486192828
weighted_mean  =  14.2932408738
weighted_std  =  0.281934567939
