-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.293927269926
cusum  =  0.222393183264
eta  =  0.628518257919
hl_amp_ratio  =  0.355534297326
kurtosis  =  -0.303729584089
n_points  =  168
period  =  0.618564954463
period_SNR  =  18.8245853139
period_log10FAP  =  -16.7834821298
period_uncertainty  =  0.000117374758224
phase_cusum  =  0.277179643349
phase_eta  =  0.36292522073
phi21  =  -2.48975216814
phi31  =  -1.57025771463
quartile31  =  0.365
r21  =  0.381349572632
r31  =  0.255535630359
shapiro_w  =  0.905014812946
skewness  =  -0.844380899988
slope_per10  =  -0.23426658036
slope_per90  =  0.15513333492
stetson_k  =  0.688347520544
weighted_mean  =  17.6309017981
weighted_std  =  0.285456221284
