-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.325832381393
cusum  =  0.140453440152
eta  =  0.451648670637
hl_amp_ratio  =  0.550915259983
kurtosis  =  -0.47066583593
n_points  =  308
period  =  0.677440650669
period_SNR  =  30.9958935247
period_log10FAP  =  -32.1906554958
period_uncertainty  =  0.00013024699583
phase_cusum  =  0.236675953955
phase_eta  =  0.420285816637
phi21  =  1.24251163323
phi31  =  2.43195093242
quartile31  =  0.41
r21  =  0.484877850501
r31  =  0.303004496583
shapiro_w  =  0.92946267128
skewness  =  -0.665768120155
slope_per10  =  -0.0914042708141
slope_per90  =  0.285449991934
stetson_k  =  0.772148855341
weighted_mean  =  14.5784260419
weighted_std  =  0.301991704023
