-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.214370457684
cusum  =  0.275297505963
eta  =  0.741597006045
hl_amp_ratio  =  1.09678682129
kurtosis  =  -0.907288210089
n_points  =  72
period  =  0.606178604786
period_SNR  =  12.0654744648
period_log10FAP  =  -6.44996552285
period_uncertainty  =  0.000146208065278
phase_cusum  =  0.26645626491
phase_eta  =  0.316712278718
phi21  =  -1.84927066924
phi31  =  -3.60823738252
quartile31  =  0.2725
r21  =  0.388075893793
r31  =  0.28274469718
shapiro_w  =  0.969287753105
skewness  =  0.170408502848
slope_per10  =  -0.853999983519
slope_per90  =  0.826457538399
stetson_k  =  0.860819580014
weighted_mean  =  14.1030080471
weighted_std  =  0.156080766473
