-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.7


######### Lightcurve features #########

amplitude  =  0.237103418886
cusum  =  0.109357716458
eta  =  0.58406245442
hl_amp_ratio  =  0.312763433228
kurtosis  =  -0.612094256952
n_points  =  313
period  =  0.542426177004
period_SNR  =  36.6620215757
period_log10FAP  =  -37.9508547098
period_uncertainty  =  8.19721617749e-05
phase_cusum  =  0.270644396089
phase_eta  =  0.551221712174
phi21  =  0.658537310429
phi31  =  3.04106506073
quartile31  =  0.33
r21  =  0.248203742077
r31  =  0.162680484654
shapiro_w  =  0.876686811447
skewness  =  -0.824654223269
slope_per10  =  -0.130492117455
slope_per90  =  0.159960788664
stetson_k  =  0.741759395541
weighted_mean  =  15.3151122261
weighted_std  =  0.213648528434
