-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.214937993978
cusum  =  0.117907043675
eta  =  0.526913380808
hl_amp_ratio  =  0.397965096253
kurtosis  =  -1.08461522208
n_points  =  367
period  =  0.629386812523
period_SNR  =  44.8252680023
period_log10FAP  =  -47.6549777786
period_uncertainty  =  0.000135887767225
phase_cusum  =  0.259074822199
phase_eta  =  0.117810741561
phi21  =  4.19254413505
phi31  =  5.36875378984
quartile31  =  0.33
r21  =  0.481456717215
r31  =  0.368364207609
shapiro_w  =  0.920248329639
skewness  =  -0.448889009078
slope_per10  =  -0.17309810071
slope_per90  =  0.167495565834
stetson_k  =  0.773118132501
weighted_mean  =  14.4117427228
weighted_std  =  0.203018289678
