-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.18


######### Lightcurve features #########

amplitude  =  5877.67835322
cusum  =  0.449418167315
eta  =  0.983302696078
hl_amp_ratio  =  13.0741475184
kurtosis  =  -1.05321229783
n_points  =  7
period  =  5.58083908007
period_SNR  =  3.133098974
period_log10FAP  =  0.0
period_uncertainty  =  0.014285507326
phase_cusum  =  0.449418167315
phase_eta  =  1.7458783318
phi21  =  -1.28148700562
phi31  =  -2.96603492718
quartile31  =  0.305
r21  =  1.02227915363
r31  =  0.517637472834
shapiro_w  =  0.684277653694
skewness  =  0.947231853374
slope_per10  =  -27.1405114548
slope_per90  =  5.52567767888
stetson_k  =  0.592523072404
weighted_mean  =  14.4757142857
weighted_std  =  0.266557800907
