-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.230517633491
cusum  =  0.133224787511
eta  =  0.564968251285
hl_amp_ratio  =  0.52050911802
kurtosis  =  -0.559902516874
n_points  =  402
period  =  0.645797446147
period_SNR  =  42.9371264265
period_log10FAP  =  -44.1316516462
period_uncertainty  =  0.000140045715596
phase_cusum  =  0.202128038909
phase_eta  =  0.750481257013
phi21  =  0.821157671863
phi31  =  -2.22181698681
quartile31  =  0.3
r21  =  0.275731780869
r31  =  0.082592540168
shapiro_w  =  0.949594259262
skewness  =  -0.576780196158
slope_per10  =  -0.0804291476108
slope_per90  =  0.131898080511
stetson_k  =  0.775314089438
weighted_mean  =  15.9716613133
weighted_std  =  0.206975069418
