-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.29


######### Lightcurve features #########

amplitude  =  0.299373678827
cusum  =  0.219318509992
eta  =  0.514852141874
hl_amp_ratio  =  0.688389114327
kurtosis  =  -0.374821763423
n_points  =  67
period  =  3.3840230922
period_SNR  =  12.0579465534
period_log10FAP  =  -6.82754591304
period_uncertainty  =  0.00320002469809
phase_cusum  =  0.30869321795
phase_eta  =  0.316535734603
phi21  =  -0.82069893809
phi31  =  -2.11319373208
quartile31  =  0.325
r21  =  0.125425073993
r31  =  0.127504525288
shapiro_w  =  0.947186231613
skewness  =  -0.561252004552
slope_per10  =  -1.49190162863
slope_per90  =  0.642259216695
stetson_k  =  0.781948380578
weighted_mean  =  14.3052470588
weighted_std  =  0.203210693667
