-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  LPV_Mira_AGB_O
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  1.20538883322
cusum  =  0.167554853574
eta  =  0.348117397464
hl_amp_ratio  =  1.31583184067
kurtosis  =  -1.08060600222
n_points  =  291
period  =  224.541410769
period_SNR  =  52.9308103416
period_log10FAP  =  -49.0727949948
period_uncertainty  =  14.0880228764
phase_cusum  =  0.248284902859
phase_eta  =  0.111904409984
phi21  =  3.51619459744
phi31  =  5.19260820813
quartile31  =  1.445
r21  =  0.0580464474131
r31  =  0.029173679685
shapiro_w  =  0.951131045818
skewness  =  0.211330437698
slope_per10  =  -7.76716442344
slope_per90  =  12.2207179439
stetson_k  =  0.858026479976
weighted_mean  =  11.7891343096
weighted_std  =  0.887020027199
