-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.326257166179
cusum  =  0.192834509371
eta  =  0.647549088536
hl_amp_ratio  =  0.608353054118
kurtosis  =  -1.03579995222
n_points  =  270
period  =  0.636907181871
period_SNR  =  37.8580481663
period_log10FAP  =  -33.7010813157
period_uncertainty  =  0.000161898124603
phase_cusum  =  0.236006873712
phase_eta  =  0.441052578128
phi21  =  1.24342581434
phi31  =  -0.680617492943
quartile31  =  0.5375
r21  =  0.426873222766
r31  =  0.182961166295
shapiro_w  =  0.929539501667
skewness  =  -0.448240587899
slope_per10  =  -0.115561818435
slope_per90  =  0.194472890364
stetson_k  =  0.832272760075
weighted_mean  =  12.6100331785
weighted_std  =  0.309900660862
