-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.357805167164
cusum  =  0.327478535968
eta  =  0.342825717817
hl_amp_ratio  =  0.743269060906
kurtosis  =  -0.205984048916
n_points  =  178
period  =  0.646555009046
period_SNR  =  16.1260755022
period_log10FAP  =  -12.0655840522
period_uncertainty  =  0.000116960027018
phase_cusum  =  0.196240629756
phase_eta  =  0.768814513287
phi21  =  0.917184846867
phi31  =  -1.59609739789
quartile31  =  0.5375
r21  =  0.0840696559857
r31  =  0.209621979008
shapiro_w  =  0.961330592632
skewness  =  -0.552797433924
slope_per10  =  -0.124596715412
slope_per90  =  0.276749988552
stetson_k  =  0.807681901214
weighted_mean  =  11.9137148218
weighted_std  =  0.382969646079
