-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.164986686894
cusum  =  0.157221822153
eta  =  0.609541676259
hl_amp_ratio  =  0.98952270297
kurtosis  =  -1.17061613261
n_points  =  237
period  =  0.725550138763
period_SNR  =  33.9543328215
period_log10FAP  =  -35.8460745025
period_uncertainty  =  0.000149832762363
phase_cusum  =  0.240992979318
phase_eta  =  0.14274663334
phi21  =  1.10175952922
phi31  =  -0.886227409345
quartile31  =  0.24
r21  =  0.408240777647
r31  =  0.206114045701
shapiro_w  =  0.950868725777
skewness  =  -0.164304619485
slope_per10  =  -0.339927249785
slope_per90  =  0.309900015148
stetson_k  =  0.854604803744
weighted_mean  =  15.7683859698
weighted_std  =  0.136968153358
