-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.55


######### Lightcurve features #########

amplitude  =  0.18258107265
cusum  =  0.129777695309
eta  =  0.687342873984
hl_amp_ratio  =  0.933911181796
kurtosis  =  -0.775188323567
n_points  =  244
period  =  0.204977332496
period_SNR  =  26.5539232647
period_log10FAP  =  -24.8073073778
period_uncertainty  =  1.17065685759e-05
phase_cusum  =  0.222866067234
phase_eta  =  0.736910508086
phi21  =  2.54973252704
phi31  =  3.57997116468
quartile31  =  0.27
r21  =  0.11016396436
r31  =  0.244320985908
shapiro_w  =  0.979501247406
skewness  =  -0.079083214158
slope_per10  =  -0.0450243931454
slope_per90  =  0.0550568859488
stetson_k  =  0.856068658969
weighted_mean  =  14.9799196154
weighted_std  =  0.165396181033
