-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.193262543086
cusum  =  0.161780992777
eta  =  0.61816417664
hl_amp_ratio  =  0.751123376588
kurtosis  =  -0.924432488448
n_points  =  339
period  =  0.787558333333
period_SNR  =  46.4817051631
period_log10FAP  =  -45.7328448321
period_uncertainty  =  0.00021001557049
phase_cusum  =  0.292126693094
phase_eta  =  0.212326244361
phi21  =  1.13052473642
phi31  =  2.36172905384
quartile31  =  0.26
r21  =  0.415246480768
r31  =  0.288077894568
shapiro_w  =  0.954060673714
skewness  =  -0.371879160089
slope_per10  =  -0.243533322431
slope_per90  =  0.323199997656
stetson_k  =  0.827084205601
weighted_mean  =  15.4002022595
weighted_std  =  0.163692753082
