-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277682122165
cusum  =  0.186896928292
eta  =  0.655810063925
hl_amp_ratio  =  0.487413657411
kurtosis  =  -0.407795095472
n_points  =  282
period  =  0.573363493991
period_SNR  =  33.554890012
period_log10FAP  =  -33.6014286979
period_uncertainty  =  0.000109952093149
phase_cusum  =  0.276490381486
phase_eta  =  0.184459184342
phi21  =  -2.32524155645
phi31  =  -1.41348161128
quartile31  =  0.3475
r21  =  0.477724406377
r31  =  0.337639764334
shapiro_w  =  0.919766783714
skewness  =  -0.722799974631
slope_per10  =  -0.149013577865
slope_per90  =  0.191945196258
stetson_k  =  0.739564027689
weighted_mean  =  16.7023324988
weighted_std  =  0.246742836518
