-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.325214255772
cusum  =  0.168010158145
eta  =  0.592602154274
hl_amp_ratio  =  0.197282703057
kurtosis  =  -0.000709549193126
n_points  =  131
period  =  0.608941422164
period_SNR  =  19.971021382
period_log10FAP  =  -14.9917275543
period_uncertainty  =  0.000160670571123
phase_cusum  =  0.275990396489
phase_eta  =  0.146630454497
phi21  =  0.988889146762
phi31  =  1.5879002911
quartile31  =  0.285
r21  =  0.378520690572
r31  =  0.207944204894
shapiro_w  =  0.816660523415
skewness  =  -1.13994957569
slope_per10  =  -0.232549996581
slope_per90  =  0.330666673059
stetson_k  =  0.639916396785
weighted_mean  =  15.1217462165
weighted_std  =  0.270880985588
