-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.334751209699
cusum  =  0.208912702725
eta  =  0.608682136441
hl_amp_ratio  =  0.88225999051
kurtosis  =  -1.1018543657
n_points  =  292
period  =  0.621816187175
period_SNR  =  31.0296478545
period_log10FAP  =  -32.3755842776
period_uncertainty  =  0.000107774577979
phase_cusum  =  0.260192861099
phase_eta  =  0.257702203959
phi21  =  4.02486171247
phi31  =  2.16158831429
quartile31  =  0.5125
r21  =  0.427816158349
r31  =  0.266756239895
shapiro_w  =  0.96225976944
skewness  =  -0.072783789357
slope_per10  =  -0.113124694563
slope_per90  =  0.236767756972
stetson_k  =  0.865958066755
weighted_mean  =  14.4210251823
weighted_std  =  0.296482964406
