-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.452788536951
cusum  =  0.115075841516
eta  =  0.631112300475
hl_amp_ratio  =  0.332257003635
kurtosis  =  -0.34430515449
n_points  =  342
period  =  0.636659465998
period_SNR  =  54.8506189247
period_log10FAP  =  -48.8412811985
period_uncertainty  =  0.000138766237193
phase_cusum  =  0.257308424096
phase_eta  =  0.175271634502
phi21  =  -2.1367556914
phi31  =  -1.03022656982
quartile31  =  0.5275
r21  =  0.363044310114
r31  =  0.226443275744
shapiro_w  =  0.890554010868
skewness  =  -0.866631080124
slope_per10  =  -0.0977761363919
slope_per90  =  0.205576541613
stetson_k  =  0.737865574803
weighted_mean  =  12.3178904665
weighted_std  =  0.383465980744
