-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.284374365713
cusum  =  0.11460582381
eta  =  0.771124543285
hl_amp_ratio  =  0.598466440166
kurtosis  =  0.133212025635
n_points  =  184
period  =  0.679739909653
period_SNR  =  20.2485985197
period_log10FAP  =  -13.0181192448
period_uncertainty  =  0.000134665967047
phase_cusum  =  0.276020364855
phase_eta  =  0.590151900972
phi21  =  1.3321270302
phi31  =  2.36014139299
quartile31  =  0.275
r21  =  0.540338598111
r31  =  0.235758696634
shapiro_w  =  0.934828519821
skewness  =  -0.614189621408
slope_per10  =  -0.182119633638
slope_per90  =  0.389036382014
stetson_k  =  0.737952397552
weighted_mean  =  13.8322159948
weighted_std  =  0.249203114328
