-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.238696409783
cusum  =  0.104051956654
eta  =  0.558405970805
hl_amp_ratio  =  0.964713171293
kurtosis  =  -0.512860518032
n_points  =  316
period  =  0.734186423479
period_SNR  =  35.1810114448
period_log10FAP  =  -35.4546498404
period_uncertainty  =  0.000152156688584
phase_cusum  =  0.231218749457
phase_eta  =  0.372518859457
phi21  =  -1.41573197032
phi31  =  -0.668610118451
quartile31  =  0.3425
r21  =  0.472208655946
r31  =  0.207294844855
shapiro_w  =  0.984252810478
skewness  =  -0.10655274706
slope_per10  =  -0.150215335738
slope_per90  =  0.126927937507
stetson_k  =  0.833604232693
weighted_mean  =  12.3178797468
weighted_std  =  0.210566440929
