-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.224804534781
cusum  =  0.092803829039
eta  =  0.499668274078
hl_amp_ratio  =  0.669389819335
kurtosis  =  -0.656169444492
n_points  =  604
period  =  0.666732168856
period_SNR  =  66.3632834764
period_log10FAP  =  -81.3938409863
period_uncertainty  =  0.000119657607587
phase_cusum  =  0.215216452013
phase_eta  =  0.320800425692
phi21  =  1.32324888641
phi31  =  -0.764999479643
quartile31  =  0.3
r21  =  0.476723750821
r31  =  0.246096183074
shapiro_w  =  0.965110599995
skewness  =  -0.447188610305
slope_per10  =  -0.0959287426142
slope_per90  =  0.114595690051
stetson_k  =  0.812373068921
weighted_mean  =  14.5321175061
weighted_std  =  0.197050952733
